import clsx from 'clsx';

export default function KanjiLogo(props: React.ComponentProps<'svg'>) {
  return (
    <svg
      xmlns="http://www.w3.org/2000/svg"
      viewBox="0 0 4034.57 10276.4"
      fill="currentColor"
      className={clsx(props?.className)}
    >
      <g>
        <path
          d="M3052.59,9481.45c-3.62,9.37-10.2,17.82-8.54,23.93c7.2,26.46,4.87,51.58-2.49,77.48
		c-5.44,19.11-2.9,37.81,9.84,54.79c17.87,23.72,21.34,50.5,16.57,79.81c-2.44,14.97,0.72,31.02,2.28,46.56
		c1.19,12.12,3.78,24.13,5.75,36.2c4.4,27.03,3.26,51.32-20.72,71.37c-18.28,15.23-24.6,37.19-22.17,61.84
		c1.14,11.71-2.23,23.82-3.78,38.01c-15.23,1.04-28.54,1.92-45.01,2.95c-1.81,23.15-1.71,48.48-24.29,68.67
		c-5.96-3.88-14.14-7.04-18.9-13c-7.41-9.37-12.53-20.61-18.85-31.44c-3.94,3.62-7.04,5.28-8.29,7.92
		c-6.01,12.27-8.34,28.07-25.95,29.57c-15.8,1.35-24.86-10.77-35.53-19.63c-13.05-10.77-19.78-29.57-43.45-32.52
		c-12.69,22.63-29.31,42.93-54.74,56.76c-19.89,10.82-22.63,33.82-13.88,56.14c7.61,19.21,19.37,37.6,14.55,63.18
		c-11.19,0.78-22.84,1.5-34.49,2.33c-33.04,2.28-46.51,18.44-42.47,51.01c0.88,6.84,1.92,13.67,2.49,20.51
		c0.16,1.61-0.88,3.32-1.5,5.33c-12.59,17.71-33.2,16.78-51.58,20.98c-16.88,3.83-34.75,5.39-50.29,12.22
		c-17.56,7.66-30.45,3.78-42.83-7.87c-28.23-26.52-42.52-60.28-45-97.99c-1.66-25.33-5.75-47.65-23.67-67.22
		c-7.77-8.49-13.05-21.49-14.5-33.09c-4.25-33.25-18.33-55.83-53.97-60.49c-4.97-0.67-9.79-3.73-14.4-6.21
		c-14.14-7.72-16.63-19.78-11.45-35.73c6.27-19.42,26.1-21.18,41.54-34.54c-3.94-8.86-6.53-18.96-12.27-26.62
		c-19.06-25.01-39.05-49.41-59.14-73.64c-32.42-39-65.26-77.74-97.78-116.68c-44.9-53.71-89.54-107.62-134.45-161.27
		c-4.51-5.33-9.79-10-14.97-14.71c-25.95-23.41-35.79-23.15-61.84,2.02c-7.56,7.3-13.93,15.9-21.91,22.68
		c-7.92,6.68-16.62,15.33-25.95,16.93c-44.28,7.46-89.18,22.01-133.36,3.26c-18.64-7.82-34.39-22.53-56.5-37.65
		c3,0.67-0.36-0.52-3.78-0.83c-41.33-3.47-47.85-9.58-47.39-50.5c0.36-31.49,3.06-62.92,4.25-94.41
		c1.14-27.81-12.01-45.89-39.15-56.14c-31.13,31.9-64.38,60.7-90.74,94.72c-24.81,32.01-31.8,73.13-38.79,112.9
		c-3.83,21.39-2.43,42.26,8.7,61.11c20.41,34.54,12.84,70.95,8.96,107.26c-1.4,13.67-1.97,27.35-3.37,41.02
		c-1.24,11.86,0.1,25.43-5.33,35.06c-10.05,17.76-7.04,33.51,0.15,50.08c6.32,14.35,13.62,28.28,19.53,42.88
		c15.8,38.95-6.73,85.04-47.34,96.23c-6.01,1.61-14.66,0.47-19.84-2.9c-24.55-15.95-54.85-23.56-73.08-49.15
		c-1.66-2.38-6.27-2.64-12.64-5.02c-4.09,6.11-10.77,12.17-12.74,19.52c-5.33,20.2-7.87,41.17-13.26,61.42
		c-5.44,20.72-20.09,26.98-40.19,18.59c-10.98-4.56-21.7-9.63-31.95-14.19c-29.52,21.75-29.57,57.38-48.89,85.19
		c-18.23-3.73-36.36-7.46-55.21-11.34c-32.37,26.26-42.11,69.14-74.53,96.02c-26.62-0.98-43.81-15.64-54.38-40.08
		c-20.82-48.16-42-96.12-62.61-144.29c-9.63-22.48-19.47-44.95-27.34-68.1c-11.34-33.56-11.81-68.78-11.96-103.89
		c-0.21-77.01,0-154.08-1.24-231.14c-0.31-24.34-3.78-48.84-7.46-72.97c-3-19.21-19.37-29.42-38.58-25.89
		c-6.84,1.29-13.78,3.26-20.04,6.21c-20.4,9.58-40.55,19.73-64.22,31.38c1.35,10.41,1.92,22.11,4.61,33.25
		c6.99,29.52-2.02,53.4-27.97,67.07c-23.31,12.33-39.72,27.76-46.04,53.55c-1.19,4.82-4.09,10.82-8.08,13.21
		c-34.6,21.18-46.97,59.97-71.52,89.03c-19.06,22.58-36.87,46.3-56.24,68.57c-6.63,7.67-15.59,14.04-24.7,18.54
		c-20.25,10.05-41.22,18.54-64.69,28.9c-17.61-0.67-28.12-15.12-34.44-31.59c-10.98-28.48-29.73-44.12-59.51-53.03
		c-30.09-8.96-54.79-4.35-79.19,12.58c-1.29,0.88-3.37,0.67-8.91,1.66c-10.15-7.41-22.53-16.42-34.7-25.27
		c-3.37,1.45-7.35,1.97-9.17,4.25c-9.94,12.12-19.52,24.6-29,37.18c-14.71,19.27-34.39,23.05-56.4,17.45
		c-10.1-2.49-19.42-7.72-29.31-11.24c-22.89-8.18-27.76-6.27-42.78,15.49c-4.76,6.84-9.53,13.67-16.11,23.05
		c-8.55-6.94-17.19-10.82-20.97-17.5c-15.59-27.71-26.52-57.23-24.91-89.86c2.33-45.42,5.49-90.79-1.4-136.26
		c-3-20.15,3.52-39,19.06-52.31c31.44-26.93,44.18-67.02,70.64-97.31c14.66-16.78,4.51-36.98,5.13-54.22
		c13-23.15,35.27-30.66,56.19-38.64c66.71-25.53,114.71-70.12,149.93-132.32c24.08-42.42,54.59-81.31,83.28-120.98
		c32.83-45.37,66.86-89.91,100.27-134.86c30.25-40.71,61.11-81,90.17-122.64c16.93-24.24,31.33-50.39,45.89-76.18
		c3-5.18,1.86-12.74,2.54-17.82c-10.98-9.17-19.06-3.57-26.26,0.16c-13.93,7.35-27.35,15.59-40.66,24.08
		c-36.67,23.36-75.41,34.6-119.79,28.69c-20.2-2.69-42.93-1.45-62.15,4.97c-64.17,21.44-120.57,2.54-175.57-28.28
		c-27.4-15.38-54.38-31.59-82.19-46.2c-12.33-6.42-25.89-11.5-39.41-14.29c-46.77-9.74-83.17-37.29-115.7-69.24
		c-43.5-42.78-80.69-91.36-120.62-141.39c8.34-8.7,14.24-17.3,22.22-22.74c59.25-40.6,119.27-79.91,178.1-120.93
		c41.22-28.64,84.68-40.24,134.03-26.98c37.13,10.05,72.66,5.08,106.58-13.62c41.33-22.89,83.33-44.49,124.76-67.17
		c132.01-72.51,263.14-146.36,387.08-232.38c31.59-21.96,64.53-42,97.06-62.56c23.88-15.02,35.06-35.48,39.15-64.22
		c7.87-55.36,19.73-110.21,31.39-165c7.98-38.01,13.62-75.82,5.7-114.25c17.66-27.4,41.43-42.36,72.61-47.85
		c25.79-4.61,50.86-13.67,76.75-17.4c40.09-5.75,78.88-13.21,115.44-32.42c31.07-16.37,64.48-12.07,97-0.78
		c26.41,9.22,52.88,18.18,79.6,26.36c17.14,5.33,33.82,5.23,50.81-3.83c10.31-5.54,22.99-7.77,34.85-8.91
		c21.49-2.12,39.88-11.29,61.73-21.13c4.5-66.7-0.57-132.12-9.69-201.05c-14.5,1.66-26.31,1.71-37.39,4.61
		c-16.73,4.4-33.25,10-49.41,16.42c-9.37,3.73-17.82,10.05-26.52,15.38c-5.96,3.62-13.41,12.27-17.04,10.82
		c-39.88-16.21-64.79,29.42-102.39,24.08c-7.3-1.09-18.59,9.58-24.34,17.56c-15.23,20.97-36.41,30.4-59.3,40.6
		c-40.34,17.97-82.29,29.68-124.35,41.48c-25.74,7.15-50.29,14.81-66.19,38.69c-2.64,3.94-8.6,5.65-16.11,10.31
		c-8.29-7.25-17.61-14.29-25.69-22.63c-19.16-19.94-26.41-22.74-49.98-12.43c-12.64,5.59-24.19,13.78-35.94,21.29
		c-10.2,6.58-19.89,13.98-30.04,21.23c-24.76-8.34-34.6-28.43-32.58-49.15c2.9-30.4-4.71-58.88-6.94-88.35
		c-1.19-15.59-0.83-31.49-0.05-47.18c1.92-36.82,3.16-72.97-11.96-108.45c-5.7-13.47-4.09-30.92-2.9-46.35
		c1.61-19.01,6.21-37.86,10.1-59.61c41.9-24.96,85.35-50.55,128.54-76.6c42.05-25.33,82.66-52.62,119.63-85.25
		c37.6-33.2,80.74-60.54,110.16-103.01c-16.47-23.1-40.09-25.01-61.27-31.85c-24.91-8.03-50.29-15.28-74.21-25.58
		c-38.22-16.47-66.34-45.63-88.2-80.12c-39.83-62.98-59.82-133.72-77.37-205.24c-0.78-3.06,1.24-6.79,2.54-12.59
		c4.45-2.54,9.99-7.67,16.26-8.75c64.69-11.08,123.41-38.64,182.3-65.57c85.92-39.2,171.32-79.65,257.14-119.32
		c58.73-27.19,117.67-53.91,176.5-81.05c32.94-15.17,37.7-22.27,34.6-55.98c-5.13-54.02-10.57-108.04-16.78-161.95
		c-1.61-13.73-5.59-27.45-9.99-40.66c-7.77-23.31-3.47-43.97,7.87-65.41c12.01-22.63,20.61-47.18,33.25-76.8
		c17.61-3.83,38.74-14.19,48.11-40.19c1.97-5.44,10.25-9.27,16.31-12.43c50.34-26.21,92.7-62.92,132.79-102.03
		c20.56-20.09,42.05-29.52,70.18-27.66c19.16,1.29,38.53-0.26,57.8,0.57c47.59,2.12,89.08,16.31,116.32,59.3
		c7.35,11.71,17.97,21.39,26.62,32.42c18.75,23.77,32.83,50.03,34.85,80.64c1.24,18.54,6.63,33.77,19.32,47.18
		c17.82,18.9,24.03,41.48,22.79,67.53c-1.09,22.68,0.57,45.52,2.33,68.21c0.72,10.05,4.71,19.83,7.77,31.85
		c13.21,0.93,25.17,3.31,36.93,2.33c29.62-2.54,59.3-5.54,88.72-10.2c50.08-7.92,94.26,5.39,132.17,37.24
		c24.55,20.61,50.8,36.15,80.79,47.39c32.11,12.02,56.86,32.89,68.78,67.48c9.84,28.64,27.45,52.57,53.4,69.66
		c27.29,17.87,39.46,43.14,37.03,75.97c-0.88,12.12,2.59,24.45,2.54,36.62c-0.05,26.41-1.45,52.46-19.68,74.47
		c-5.39,6.58-7.87,15.54-11.76,23.36c-32.58,65.82-84.31,105.24-157.8,115.39c-8.39,1.14-16.78,4.71-24.34,8.8
		c-36.93,19.78-73.39,40.55-110.47,60.13c-11.86,6.27-19.52,14.14-20.72,27.55c28.9,24.55,135.58,76.65,168.42,80.79
		c41.69,5.13,83.48,10,125.38,12.64c21.65,1.35,40.81,6.63,59.82,16.68c21.54,11.45,43.81,22.01,66.7,30.3
		c45.73,16.57,82.91,45.94,113.42,81.62c27.03,31.7,47.23,69.29,70.38,104.3c0.93,1.45,1.76,3,2.54,4.61
		c14.4,29.99,6.99,116.06-13.93,141.59c-8.55,10.46-20.15,20.51-32.47,25.22c-26,10.05-52.93,20.87-80.22,23.46
		c-76.85,7.35-153.87,4.25-229.79-10.98c-29.31-5.9-55.52-19.42-80.17-37.19c-74.68-53.81-157.75-89.7-247.92-108.03
		c-20.2-4.09-41.48-3.78-61.06,0.62c-13.88,20.35-11.86,41.85-11.91,62.51c-0.21,99.8,1.19,199.6,0.16,299.45
		c-0.73,62.98-4.66,125.85-7.56,188.77c-0.62,14.09-2.59,28.17-20.87,38.22c-13.31-3.88-29.52-8.6-47.7-13.93
		c-11.03,10.93-21.86,21.6-34.7,34.23c-7.2-4.45-15.64-7.41-20.61-13.36c-8.75-10.15-15.33-22.11-22.94-33.56
		c-34.7,29.05-69.81,54.28-84.93,101.25c-20.51-13.62-34.23-22.68-50.29-33.35c-8.39,15.54-15.17,29.36-22.99,42.52
		c-6.99,11.6-21.6,13.36-31.54,3.62c-8.49-8.39-15.8-18.02-26-29.73c-9.53,6.89-18.33,11.76-25.33,18.54
		c-18.75,18.44-37.75,36.3-61.68,45.37c-41.38-7.66-40.09-52.1-65-71.42c-18.85-1.86-26.78,11.19-32.37,23.36
		c-7.15,15.59-11.81,32.52-15.12,49.41c-1.09,5.07,4.4,13.93,9.38,17.4c18.7,12.69,37.34,26.52,58,34.91
		c26.46,10.72,51.43,22.42,70.49,43.97c13.57,15.38,31.23,21.34,50.24,26.1c15.12,3.78,30.19,8.75,44.28,15.38
		c14.81,6.99,26.2,19.58,27.71,36.1c2.33,25.38,14.92,46.3,24.81,68.62c23.25,52.72-9.17,113.89-66.29,122.84
		c-31.75,5.02-61.06,15.38-88.35,31.44c-21.13,12.43-40.66,26.67-66.7,28.33c-7.35,0.41-16.73,7.25-21.03,13.88
		c-14.03,21.6-34.7,33.97-55.93,46.51c-10.57,6.16-20.04,14.09-30.04,21.18c-19.68,13.83-32.63,30.61-30.3,56.87
		c2.23,26.15-10.82,47.08-27.29,66.19c-12.95,15.17-22.89,31.33-10.82,52.05c15.59,6.94,26.46-4.3,38.17-10.67
		c121.29-66.5,241.7-134.39,363.72-199.49c134.34-71.62,269.93-140.92,405.2-210.84c58.26-30.14,58.99-29.73,59.66-96.59
		c0.67-66.76,6.84-132.79,17.87-198.61c7.46-44.75,14.76-89.96,5.39-132.48c28.43-26.62,54.79-51.22,81.77-76.55
		c-2.8-21.75-5.33-42.05-7.61-60.18c4.5-4.71,6.84-9.32,9.17-9.37c53.97-0.47,95.09-33.2,139.06-57.23
		c33.51-18.28,70.23-32.11,98.35-59.66c2.43-2.38,5.9-4.04,9.17-5.02c55.62-15.8,111.45-33.3,170.13-21.34
		c44.28,9.06,80.95,30.4,105.75,70.69c19.27,31.18,23.31,62.87,8.03,94.88c-15.02,31.44-32.26,62.2-52.1,90.84
		c-36.51,52.67-25.79,108.91-23.72,169.56c20.2-1.19,34.02-0.62,47.28-3.06c20.61-3.68,41.12-8.7,61.27-14.5
		c37.29-10.67,74.89-17.35,113.89-16.47c15.54,0.36,31.59-1.4,46.77-5.08c39.93-9.69,80.22-3.83,120.31-4.97
		c18.44-0.52,34.18,7.35,45.16,22.63c29.57,41.17,58.31,82.81,88.4,123.52c11.5,15.54,16.99,29.57,6.16,47.85
		c-5.18,8.65-8.55,19.52-8.96,29.57c-1.97,40.4-21.8,71-44.38,103.48c-23.36,33.56-45.94,47.49-86.96,37.86
		c-20.97-4.87-45.21,1.5-67.27,5.9c-9.12,1.81-17.51,10.93-24.65,18.28c-12.79,13.05-26.67,15.43-42.83,7.82
		c-4.77-2.23-9.58-4.51-14.55-5.96c-16.57-4.71-31.18-1.76-42.57,12.07c-13,15.69-20.92,41.38-45.94,37.44
		c-17.87-2.8-34.03-16-51.12-24.39c-3.06-1.5-6.58-2.23-13.67-4.56c-23.88,16.73-52.2,27.6-85.35,10.46
		c-4.3,10.56-9.53,18.02-10.15,25.9c-1.5,19.16-1.24,38.48-1.09,57.75c1.14,99.59-7.56,199.24,9.27,298.67
		c6.06,35.73,2.02,73.33,0.31,110c-2.12,45.73-0.62,90.79,7.35,136c4.09,23.25,13.36,39.98,36.04,46.56
		c120.41,34.85,226.79,100.68,339.02,153.5c80.84,38.01,158.37,82.4,227.05,140.61c2.64,2.28,6.16,3.73,8.44,6.27
		c47.8,53.24,112.95,81.36,171.68,118.7c27.14,17.19,48.73,37.65,64.94,66.55c23.98,42.57,52.93,82.4,79.86,123.31
		c3.83,5.8,11.45,10.56,12.48,16.62c7.25,42.52,37.24,74.63,50.91,114.04c2.75,8.03,5.9,18.54,2.95,25.43
		c-11.86,27.66-4.77,55.36-2.85,82.97c1.24,18.59-1.86,34.75-17.82,46.51c-14.97,10.98-23.93,25.27-23.51,44.54
		c0.41,19.42-8.91,33.71-25.53,42.62c-45.16,24.19-64.22,61.68-60.49,112.33c1.92,26.15-13.36,46.66-26.88,66.86
		c-4.25,6.32-14.4,11.81-21.96,12.02c-15.38,0.41-32.42,0.47-45.94-5.59c-54.12-24.34-107.36-50.86-160.55-77.22
		c-10.82-5.33-21.85-12.07-29.93-20.77c-22.63-24.24-45.78-48.37-65-75.25c-38.58-53.86-87.58-93.22-145.89-124.45
		c-60.02-32.16-118.7-67.33-171.84-110.83c-48.79-39.93-99.13-77.94-155.68-106.58C3072.01,9488.23,3063.77,9485.8,3052.59,9481.45
		 M2127.26,8518.36c-24.13-3.11-37.76,4.2-51.58,11.55c-30.66,16.42-60.39,35.63-92.76,47.34c-33.14,11.91-64.27,26.21-93.89,44.8
		c-10.15,6.37-22.17,9.84-33.3,14.66c-7.87,3.42-16.68,5.65-23.51,10.62c-33.82,24.6-67.79,48.94-100.37,75.09
		c-32.63,26.15-66.76,49.41-104.56,67.28c-7.87,3.73-15.38,8.29-23.1,12.27c-24.19,12.59-35.63,31.13-33.25,59.46
		c2.02,24.29,2.59,49.1-0.16,73.23c-4.35,38.12,6.37,68.21,36.56,92.55c17.66,14.24,33.04,31.23,36.82,55.47
		c5.07,32.99,28.07,50.24,56.92,64.63c6.89-6.32,14.19-11.24,19.21-17.92c21.18-27.76,42-55.83,62.3-84.11
		c46.87-65.26,93.69-130.41,139.89-196.13c29.05-41.33,55.57-84.57,85.61-125.23c40.6-54.95,76.29-112.7,107.83-173.13
		C2120.53,8541.93,2122.65,8531.83,2127.26,8518.36 M2317.69,9432.66c12.79,3.88,22.43,6.01,31.44,9.68
		c22.53,9.06,44.33,20.41,67.43,27.92c19.89,6.47,39.46,11.19,56.76,24.81c16.21,12.69,35.84,4.66,40.91-14.71
		c3.06-11.65,3.99-24.13,3.99-36.2c-0.1-62.87-0.78-125.69-1.45-188.57c-0.16-12.17-1.35-24.44-1.97-36.62
		c-0.67-13.15-6.42-24.13-17.35-30.66c-27.03-16.21-55.78-34.13-87.27-31.54c-32.83,2.69-56.97-6.42-81.1-26.72
		c-21.44-18.02-40.5-12.74-47.96,13.21c-13.15,45.78-33.77,87.83-57.59,128.54c-11.13,19.06-15.69,38.58-7.35,60.02
		c0.98,2.59-1.29,6.47-1.97,9.17c-11.19,7.67-22.06,15.17-33.35,22.89c4.14,9.43,5.8,16.42,9.79,21.8
		c38.12,51.27,87.73,89.13,142.47,120.67c2.85,1.61,8.75-1.97,12.74-3C2346.59,9476.53,2317.33,9463.42,2317.69,9432.66
		 M1284.69,9366.01c-29.52,36.25-33.09,44.49-34.18,79.45c-0.67,19.16-2.12,38.43-1.55,57.59c1.4,45.42,2.02,91.05,17.14,134.65
		c2.49,7.04,8.91,12.74,15.07,21.23c16.99-19.89,19.99-41.07,23.05-61.27c6.37-42.73,25.33-79.19,52.98-118.5
		c5.23,15.07,10.31,25.53,12.43,36.56c7.56,39.72,18.49,78.25,40.09,112.95c3.11,4.97,8.8,8.29,13.62,12.64
		c15.64-16.31,18.8-33.25,18.23-50.91c-0.57-20.92-2.85-41.85-3.68-62.77c-1.71-45.99-23.77-79.13-63.29-102.34
		c-5.9,2.95-12.07,6.21-18.33,9.06c-1.09,0.52-2.74-0.36-7.3-1.14C1344.77,9398.63,1327.99,9372.12,1284.69,9366.01 M1155.22,9673.9
		c6.32-5.65,10.77-8.55,13.83-12.48c22.32-29.67,27.81-63.91,24.13-99.64c-5.07-49.1-2.38-97.62,4.82-146.36
		c4.09-27.55,4.14-55.83,4.82-83.8c0.31-12.38-2.64-24.6-18.59-27.97c-20.15,7.56-40.66,15.33-59.2,22.32
		c1.29,43.35,2.02,83.59,3.94,123.67c3,61.16,6.68,122.33,10.41,183.39C1140.2,9646.86,1139.99,9661.36,1155.22,9673.9
		 M2228.97,9540.59c-34.7-43.82-64.74-83.38-106.63-115.8c-14.66,20.92-27.19,38.95-39,55.73c2.9,7.72,3.99,13,6.63,17.35
		c25.64,42.26,62.51,74.58,97.83,108.08c8.65,8.18,19.99,14.04,30.97,19.11c5.28,2.43,12.53,0.41,20.87,0.41
		c-3.83-30.61-34.8-41.95-39.31-68.36c2.38-2.28,4.45-4.97,7.2-6.63C2211.78,9548.05,2216.44,9546.29,2228.97,9540.59
		 M2745.47,8447.72c-20.2,30.25-24.13,38.89-13.67,65.41c13.83,35.06,19.37,70.33,18.18,107.62c-0.62,19.99,1.09,20.04,17.97,46.77
		c18.33-17.71,0.67-45.01,18.96-63.75c10.77,23.3-7.82,54.02,18.75,73.8c9.22-67.64-5.13-131.13-9.53-195.14
		C2774.42,8478.85,2774.42,8478.85,2745.47,8447.72 M2963.66,8699.06c1.76,0.05,3.52,0.1,5.33,0.21c0,24.34-1.19,48.79,0.83,73.02
		c0.52,5.9,10.62,13.52,17.76,15.8c10.88,3.42,14.86-6.42,16.16-15.23c1.29-8.54,1.55-17.4,0.78-26.05
		c-3.42-40.14-0.78-79.96,1.71-120.1c2.07-34.39-4.04-69.35-7.67-103.94c-0.88-8.29-5.39-16.73-10-23.82
		c-2.28-3.52-9.01-6.42-13.05-5.8c-4.25,0.67-10.51,5.7-10.98,9.37c-1.5,11.76-2.95,24.29-0.31,35.58
		c5.49,24.08,7.92,47.7,4.97,72.5C2965.79,8639.86,2965.37,8669.59,2963.66,8699.06 M1452.75,8970.07c3.99-0.26,9.11-0.31,9.17-0.67
		c1.35-20.61,2.75-41.17,2.95-61.78c0-2.75-6.27-5.65-15.02-13.05C1445.34,8923.77,1447.1,8946.87,1452.75,8970.07 M1537.37,9581.76
		c-3.88-5.02-6.58-8.49-9.32-11.91c-2.54,2.95-7.3,6.01-7.25,8.96c0.1,3.83,3.99,7.56,6.27,11.29
		C1530.17,9587.56,1533.28,9585.08,1537.37,9581.76"
        />
        <path
          d="M1719.24,1206.86c10.98-3,22.27-3,27.09,8.75c9.89,24.34,22.48,46.4,38.95,67.22
		c11.81,14.97,14.92,34.13,7.66,54.74c-6.27,17.82-6.78,37.6-11.03,56.24c-2.28,9.89-4.56,21.91-11.24,28.33
		c-21.29,20.56-43.76,40.09-67.43,57.85c-20.87,15.64-45.21,26.72-65.67,42.78c-59.87,46.87-126,83.12-196.13,110.47
		c-40.5,15.8-57.28,40.66-59.35,81.93c-2.64,52.41-8.34,104.67-11.96,157.08c-0.88,11.71,1.35,23.67,2.43,39.2
		c10.77-2.33,20.09-1.97,26.36-6.16c20.25-13.62,40.91-27.29,58.63-43.87c69.09-64.63,133.72-133.67,195.97-204.93
		c20.66-23.72,43.3-45.78,64.53-69.04c31.8-34.96,62.92-70.49,94.67-105.44c16.31-18.07,33.35-35.58,50.03-53.4
		c9.53-10.15,20.82-19.32,28.22-30.92c25.17-39.67,49.72-79.81,73.28-120.51c25.27-43.87,49.1-88.66,73.8-132.84
		c2.33-4.19,6.63-7.3,9.53-10.41c10.77,0.52,13.67,8.08,11.08,14.4c-11.13,27.5-22.53,55-35.94,81.41
		c-7.77,15.33-19.53,28.69-31.33,45.47c7.87,22.37,3.63,45.21-9.27,67.64c-5.85,10.25-5.18,23.98-9.63,35.32
		c-8.96,22.63-18.9,44.9-29.37,66.91c-5.13,10.93-13.21,20.51-18.23,31.49c-5.59,11.96-3.88,23.77,5.44,34.08
		c10.31,11.45,25.43,19.47,26.93,34.65c-22.17,43.5-43.35,85.04-64.53,126.62c13.41,18.85,25.33,35.53,37.19,52.15
		c-10.82,17.4-20.3,31.95-29.16,46.87c-5.33,9.01-11.76,18.18-13.98,28.07c-13.83,61.06-49.77,106.22-98.71,142.99
		c-13.88,10.51-25.95,23.46-39.1,34.96c-15.12,13.31-24.29,29.11-25.69,49.77c-0.67,10.36-5.18,20.35-6.94,30.71
		c-10.3,61.73-42.93,109.85-90.22,149.15c-9.27,7.77-18.65,15.49-29.68,24.6c4.87,11.91,9.22,22.58,13.26,32.63
		c-14.55,24.29-28.69,48.22-43.19,71.94c-28.54,46.56-64.95,86.23-106.38,121.65c-14.6,12.43-28.12,26.2-41.43,40.03
		c-5.9,6.21-11.81,13.47-14.71,21.34c-14.35,39.36-27.71,79.03-41.43,118.6c-7.51,21.86-10.1,44.18-7.82,67.28
		c2.23,22.63,3.68,45.37,4.71,68.1c1.04,23.15,7.2,44.23,18.33,64.89c9.79,18.18,17.04,38.33,21.54,58.47
		c2.9,12.84,0.21,27.55-2.43,40.91c-4.19,20.51-11.44,40.4-15.59,60.9c-8.08,39.83-0.47,76.49,25.38,108.66
		c4.35,5.44,8.75,10.98,12.17,17.04c5.49,9.79,5.18,19.42-0.47,29.73c-31.28,56.66-35.84,119.48-40.19,182.09
		c-0.73,10.15,2.07,21.13,5.8,30.76c16.83,43.4,0.93,83.12-15.12,121.66c-12.84,30.92-31.7,36.67-64.17,26.31
		c-18.07-5.75-35.01-15.9-58.21-15.43c-8.29,38.38-27.34,74.32-25.32,115.54c0.31,6.94,0.52,14.09-0.62,20.92
		c-2.95,19.11-15.48,32.21-35.37,32.37c-26.36,0.26-52,2.9-77.68,9.06c-17.66,4.25-35.68,0.15-49.98-10.98
		c-19.16-14.92-39-30.04-54.64-48.37c-25.01-29.37-44.54-62.61-57.02-99.8c-23.31-69.66-47.7-138.95-71.11-208.61
		c-18.64-55.52-23.56-112.8-21.54-171.11c1.24-34.65,0.26-69.4,0.26-106.22c-21.18-5.23-39-0.21-47.6,19.84
		c-9.79,22.79-25.12,37.08-48.16,44.64c-4.71,1.5-11.19,4.97-12.33,8.86c-7.51,26.1-26.67,32.89-50.91,37.34
		c-17.25,3.16-30.71,16.42-37.13,34.28c-4.92,13.73-12.02,27.71-26.1,30.97c-27.34,6.42-43.04,24.65-62.04,43.45
		c-23.56,23.31-49.72,43.14-64.79,73.85c-2.9,5.8-8.96,11.65-14.97,14.24c-43.76,18.49-68.52,58.63-101.09,89.49
		c-42.16,39.93-93.69,52.15-148.53,29.52c-14.29-5.9-29.62-11.91-44.75-12.58c-34.44-1.56-54.22-19.94-67.59-49.41
		c-26.21-57.8-45.37-117.36-49.36-181.26c-1.14-17.3-3.21-35.01-8.18-51.53c-6.06-20.25-15.8-38.74-39.52-45.16
		c-19.47-5.23-27.76-20.87-28.95-39.62c-1.19-19.06-2.64-38.64,0.05-57.44c8.29-59.14,10.25-118.55,11.6-178.16
		c0.52-22.43,5.33-45.01,9.94-67.12c9.89-47.54,35.37-83.23,81.15-102.8c6.37-2.69,11.91-7.46,18.39-10.05
		c32.83-13.31,52.88-36.51,65.15-70.33c15.17-42.16,43.66-76.18,82.24-99.49c25.22-15.28,42.57-35.63,54.38-61.99
		c55.73-124.61,113.47-248.33,166.4-374.13c21.6-51.27,33.15-106.79,48.27-160.65c2.64-9.48,0.36-20.3,0.36-33.4
		c-10.72-2.64-20.3-6.27-30.09-7.15c-71.52-6.32-143.1-11.39-214.57-18.13c-52.36-4.92-104.1-13.72-154.13-31.02
		c-51.89-17.87-103.01-74.01-114.66-126.94c-3.37-15.17-9.79-29.73-12.9-44.95c-3.52-16.88-6.11-34.18-6.84-51.43
		c-0.62-15.12,7.41-27.6,22.01-32.68c33.09-11.6,58.26-39.1,93.9-45.83c14.55-2.8,24.81-13.52,30.92-26.57
		c14.09-30.19,36.72-44.95,70.43-44.64c23.41,0.15,44.38-9.17,62.82-23.62c4.14-3.26,8.6-6.11,12.64-9.43
		c23.31-19.27,59.09-14.45,78.93-39.26c19.21-24.08,45.58-37.91,70.12-54.43c20.46-13.73,41.07-26.36,66.19-30.66
		c21.7-3.73,38.89-16.11,49.25-35.89c14.86-28.33,39.15-42.36,68.41-53.08c32.68-11.91,64.01-28.02,94.93-44.23
		c40.29-21.08,79.34-44.69,119.48-66.14c29.26-15.64,59.51-29.47,89.23-44.23c19.16-9.53,26.78-18.85,22.01-36.77
		c-19.47-73.18-5.9-146-1.71-219.23c5.13-89.29-1.09-178.47-11.24-267.29c-3.73-32.42-19.42-59.56-41.54-83.17
		c-11.81-12.64-23.57-25.43-36.1-39c4.4-14.4,5.9-29.16,13-40.5c21.23-33.97,44.49-66.7,67.22-99.75
		c8.91-12.95,19.01-25.07,27.71-38.12c56.35-84.94,137.14-130.35,237.09-133.41c66.81-2.07,132.79,14.4,187.17,57.95
		c46.87,37.39,82.24,85.56,117.15,133.67c12.64,17.35,13.62,39.31,13.46,60.65c-0.21,37.19-9.17,72.82-19.01,108.24
		c-18.8,67.38-40.5,133.83-48.27,204.05c-4.61,41.59-14.61,82.55-22.17,123.83c-6.63,36.41-7.3,72.97-4.56,112.64
		c9.74,2.43,19.27,6.84,28.74,6.79c22.74-0.05,45.47-3.52,68.21-3.21c38.17,0.47,47.02,10.67,48.58,51.32
		c0.21,5.18,0.62,10.36,1.19,18.8c8.29,3.57,17.51,7.3,26.57,11.5c12.48,5.85,25.95,10.46,36.82,18.54
		c11.6,8.55,18.8,21.6,12.43,36.93c-6.06,14.6-2.48,26.41,5.34,39.41c5.07,8.39,9.48,20.56,7.25,29.26
		c-5.65,22.17,18.28,32.89,17.09,52.31c28.22,9.01,25.79,33.4,28.17,55.57c0.52,4.92,2.95,9.68,4.4,14.4
		c-3.32,1.45-6.53,3.06-9.79,4.61c0.93,0.47,2.49,1.5,2.64,1.29C1715.46,1211.73,1717.32,1209.24,1719.24,1206.86 M675.05,2371.41
		c17.76-2.38,28.33-1.55,36.82-5.39c38.32-17.14,75.82-36.04,114.04-53.4c34.39-15.64,48.68-42.88,49.93-79.19
		c3.83-108.45,8.44-216.89,11.65-325.34c0.62-22.22,4.25-45.42-6.16-66.34c-4.4-1.24-8.08-3.73-10.98-3
		c-40.6,10.31-81.21,20.82-121.65,31.7c-11.08,3-16.68,14.24-11.5,24.86c6.84,13.98,14.81,27.66,23.82,40.34
		c14.86,20.92,22.22,43.56,19.32,69.09c-1.76,15.59-2.59,31.54-6.63,46.61c-11.81,43.92-24.39,87.68-37.91,131.13
		C717.16,2242.4,697.48,2301.96,675.05,2371.41"
        />
        <path
          d="M3008.76,4646.21c-2.43,35.11,1.81,67.38,14.92,98.71c8.34,19.99,7.35,41.28-3.73,60.96
		c-6.21,10.98-10.62,22.01-5.9,34.91c10.98,30.04,3.47,59.3-6.99,87.16c-16.63,44.23-30.87,88.72-42.37,134.81
		c-9.74,38.79-18.02,78.1-28.48,116.68c-9.48,35.01-24.44,68.83-40.34,101.51c-7.35,15.07-22.27,26.62-34.6,38.95
		c-9.94,9.84-20.35,19.53-31.9,27.29c-27.66,18.7-43.35,44.54-50.55,76.7c-7.56,33.66-25.17,60.07-53.6,81
		c-16.47,12.02-28.12,30.56-41.74,46.35c-6.84,7.92-12.01,17.71-20.04,24.03c-16.57,13.05-19.37,29.88-23.46,49.67
		c-8.34,40.81-21.6,80.9-36.2,120c-15.85,42.37-55.83,55.05-94.41,67.17c-7.66,2.38-18.13,1.04-25.58-2.33
		c-46.09-20.87-92.29-13.72-138.75-2.64c-3.21,0.78-6.89-0.57-10.15-0.93c-14.19-8.39-9.22-20.92-7.51-32.78
		c7.67-52.31,5.18-55.1-49.92-57.23c-3.47-0.16-6.99-0.73-13.62-1.35v-44.75c-5.8-1.55-10.77-4.3-15.23-3.68
		c-8.54,1.24-16.78,4.82-25.32,6.63c-25.69,5.65-35.79-4.56-30.97-31.44c1.19-6.78,4.87-13.15,6.06-19.99
		c1.45-8.44,1.5-17.14,2.43-29.11c-12.53-2.43-23.93-6.84-35.16-6.53c-62.98,2.02-125.9,5.13-188.83,7.77
		c-8.13,0.31-17.25,4.87-25.48-8.29c5.33-4.92,10.57-11.03,16.99-15.54c66.14-46.25,126.42-99.33,186.49-153.09
		c61.27-54.79,125.69-106.17,190.33-156.92c34.65-27.24,66.7-55.98,95.14-89.85c67.64-80.58,132.12-163.29,177.12-259.36
		c12.53-26.88,24.03-54.33,35.17-81.88c25.48-62.87,17.14-127.35,8.03-191.62c-9.43-66.4-28.95-129.63-61.42-188.62
		c-5.07-9.22-9.53-18.75-13.47-28.49c-30.14-75.04-81.67-133.98-140.87-187.01c-24.13-21.6-52.77-34.13-84.62-39.15
		c-22.37-3.47-34.6,3.37-39.62,24.08c-9.32,39-17.45,78.36-26.21,117.56c-4.19,18.7-8.44,37.44-13.31,55.98
		c-6.06,22.63-17.61,41.54-36.31,56.35c-27.34,21.75-53.08,45.73-81.31,66.24c-17.4,12.64-26,26.83-25.69,48.06
		c0.36,24.5-0.98,48.99-1.45,73.49c-0.98,44.13-7.35,86.9-25.89,127.77c-9.37,20.51-15.8,42.68-21.54,64.63
		c-8.08,30.76-18.95,59.97-38.69,85.4c-3.16,4.04-6.47,8.44-8.08,13.26c-27.86,87.42-81.98,162.15-119.27,244.97
		c-6.37,14.24-16.16,27.14-25.89,39.41c-26.26,33.2-47.91,69.14-65.2,107.52c-18.95,41.9-44.07,79.7-73.02,114.87
		c-37.91,45.94-77.43,90.37-116.37,135.33c-5.75,6.63-12.64,12.22-18.59,18.65c-37.65,40.6-82.29,56.97-137.4,41.74
		c-12.84-3.57-27.45-1.09-41.17-1.35c-15.64-0.26-31.28-0.36-46.87-0.57c-12.12-0.21-24.24-0.73-36.36-0.67
		c-8.65,0.05-18.18,3.37-25.84,0.78c-27.45-9.32-54.33-10.41-82.4-2.85c-12.38,3.26-24.19-6.68-26.57-19.73
		c-1.55-8.49-2.17-17.4-1.61-26.05c2.64-41.79-12.27-73.96-46.14-99.8c-24.76-18.95-46.51-42.21-68.36-64.79
		c-20.97-21.55-36.51-46.87-46.04-75.67c-6.27-18.9-15.28-34.65-36.25-41.38c-19.58-6.27-31.02-21.7-38.64-40.34
		c-5.96-14.55-13.98-28.38-19.16-43.19c-9.53-26.88-28.64-42.98-54.02-53.65c-17.51-7.35-34.6-15.64-53.6-24.29
		c1.4-14.45,1.24-26.57,4.04-37.91c2.85-11.76,7.92-23.2,13.26-34.13c21.49-43.45,34.39-87.94,21.03-136.78
		c-1.76-6.53-2.28-14.61,0-20.72c8.08-22.11,3.78-44.02-1.45-65.67c16.16-10.93,35.01-17.56,43.4-30.81
		c13.78-21.8,20.92-47.85,30.51-72.2c1.86-4.82,3.21-10.15,3.47-15.33c1.14-24.24,12.27-43.09,29.83-59.2
		c21.86-19.94,39.15-44.28,65.41-60.08c17.66-10.56,23.05-29.62,19.63-50.7c-2.8-17.19-5.96-34.65-6.01-51.95
		c-0.15-36.51,12.07-69.03,39.67-93.74c16.94-15.12,36.72-27.03,53.4-42.36c15.02-13.78,27.55-30.25,40.34-44.59
		c15.64,4.82,13,17.56,17.25,26.31c3.88,7.82,6.63,16.21,10.88,23.82c6.89,12.22,20.92,16.26,30.97,6.58
		c37.55-36.25,74.22-73.49,110.78-110.73c3.42-3.42,4.25-9.48,7.09-16.21c-4.92-7.35-10.46-15.54-17.3-25.74
		c9.68-9.79,18.23-21.23,29.26-29.11c37.03-26.36,74.99-51.48,112.54-77.06c17.3-11.81,37.29-21.23,51.22-36.2
		c29.68-31.95,66.14-53.6,105.96-65.88c90.12-27.76,177.8-64.74,271.22-80.22c61.94-10.31,124.35-20.3,186.7-26.05
		c101.4-9.43,203.74-3.11,300.74,30.3c57.49,19.73,111.24,50.7,165.67,78.36c55.16,27.97,99.02,71.78,147.19,109.43
		c30.25,23.62,59.51,48.47,88.82,73.18c6.63,5.59,13.67,11.91,17.56,19.42c25.01,47.8,54.33,94.83,47.18,152.26
		c-2.59,20.66,2.02,38.22,13.1,54.64c20.2,29.78,30.4,62.67,33.2,98.4c0.93,12.12,5.02,23.98,6.73,36.05
		C2961.74,4596.85,2972.1,4629.38,3008.76,4646.21 M2029.68,4255.61c-3.11-26-5.39-52.15-9.63-78
		c-2.17-13.57-13.36-19.68-27.55-18.02c-5.13,0.67-10.46,1.24-15.43,2.9c-34.85,11.5-70.18,21.91-104.25,35.42
		c-22.58,8.91-45.63,19.37-64.43,34.18c-52.31,41.23-115.23,66.76-163.71,113.37c-6.06,5.8-14.97,9.27-23.15,12.12
		c-27.14,9.43-41.48,30.14-52.51,55.16c-8.39,18.95-17.04,38.53-29.42,54.95c-28.54,37.81-56.76,75.61-76.34,119.12
		c-5.8,12.95-12.43,24.6-29.21,26.67c-15.48,1.81-23.41,14.6-30.61,26.62c-9.84,16.52-18.13,33.97-27.86,50.55
		c-14.55,24.86-15.02,49.77-1.71,74.99c22.74,43.35,45.83,86.49,68.62,129.79c9.84,18.64,26.57,27.24,45.94,31.7
		c52.46,12.12,100.89,2.28,144.75-28.74c34.34-24.29,68.36-48.89,101.97-74.06c30.4-22.63,49.61-53.81,63.34-88.56
		c7.09-17.82,13.67-35.94,21.13-53.6c15.74-36.98,32.01-73.75,47.96-110.57c11.86-27.29,23.41-54.64,35.27-81.88
		c8.29-19.16,22.58-32.73,43.61-33.04c35.11-0.52,48.01-23.15,57.64-51.22C2020.67,4356.91,2028.64,4307.09,2029.68,4255.61"
        />
        <path
          d="M2343.45,1917.59c1.76-6.63,2.9-13.57,5.44-19.89c30.71-74.37,59.09-149.83,93.01-222.75
		c48.27-103.84,116.99-190.54,221.76-244.34c56.04-28.8,110.42-60.65,166.09-90.27c50.03-26.72,94.05-60.44,129.37-105.29
		c9.74-12.33,20.66-23.77,30.92-35.73c28.69-33.35,28.64-33.41,30.97-79.6c58.88-44.85,91.2-32.99,128.02-6.21
		c25.48,18.54,52.93,26.1,82.55,30.09c15.64,2.07,31.59,2.18,46.92,5.39c51.69,10.82,93.95,37.08,126.06,79.34
		c20.09,26.52,40.34,52.98,60.9,79.08c23.25,29.47,30.19,60.44,19.68,98.09c-17.87,63.96-30.51,129.06-29.99,196.28
		c0.1,14.86-7.98,29.88-12.95,44.64c-6.68,19.78-17.3,38.84-20.3,59.14c-6.79,45.47-28.43,78.05-70.64,96.79
		c-6.06,2.75-11.5,6.94-20.09,12.27c4.66,12.02,6.21,25.12,13.41,33.25c22.43,25.43,39.77,56.4,71.37,73.49
		c22.16-26.31,2.54-56.3,10.82-86.23c11.03,4.04,19.32,5.7,26,9.84c11.65,7.15,20.77,18.9,37.13,7.04
		c3.68-2.64,17.82,2.64,22.06,8.18c39.77,51.69,88.15,94.67,136.21,138.02c3.83,3.47,7.35,8.03,9.01,12.84
		c21.44,62.1,58.52,120.41,43.19,191.42c-3.06,14.34,1.45,31.28,5.65,46.09c9.84,34.85,10.57,68.88-2.02,103.06
		c-13,35.27-16.57,71-8.96,108.4c6.79,33.3,2.49,65.98-11.34,97.62c-5.54,12.53-8.08,26.67-9.79,40.34
		c-1.76,14.35-5.75,26.88-14.45,38.64c-24.91,33.82-30.61,73.8-30.87,113.94c-0.15,25.58-3.52,49.15-18.85,69.35
		c-13.21,17.5-19.16,36.77-22.74,57.85c-3.21,19.11-10.36,36.41-24.18,51.38c-45.11,48.84-88.1,99.75-134.39,147.39
		c-24.13,24.86-52.52,46.04-80.84,66.19c-12.27,8.65-29,11.91-44.18,15.28c-17.04,3.68-34.6,6.27-52,6.63
		c-39.98,0.72-65.67,24.13-82.66,55.67c-9.58,17.66-19.32,33.72-35.79,43.71c-23.2,14.14-33.04,35.53-37.65,60.23
		c-4.71,24.81-11.24,47.28-36.93,59.56c-6.94,3.31-12.07,12.53-15.8,20.15c-10.51,21.34-28.95,34.85-46.82,48.84
		c-35.79,27.97-72.14,55.16-107.57,83.48c-53.6,42.83-111.4,78.67-173.24,108.09c-26.98,12.79-54.43,23.72-84.94,25.22
		c-8.44,0.41-16.68,4.5-27.03,7.46c-4.25,8.86-9.32,17.87-13.05,27.4c-13.83,35.27-40.45,55.73-75.2,68.05
		c-32.94,11.7-65.46,24.55-98.09,37.03c-23.2,8.91-46.77,14.4-71.88,9.79c-38.17-7.09-76.7-5.85-115.18-3.57
		c-50.29,3-97.78-5.54-140.04-34.49c-23.98-16.47-49.46-25.53-79.08-21.18c-14.71,2.18-27.09-4.3-38.89-12.69
		c-34.91-24.81-64.01-54.38-80.9-94.52c-3.42-8.08-6.89-16.11-10.57-24.03c-7.04-15.12-18.07-25.74-34.75-29.26
		c-55.78-11.91-80.95-50.39-90.99-102.91c-4.3-22.27-11.81-43.92-16-66.24c-2.17-11.45-0.36-23.62-0.36-38.69
		c13.21-0.72,24.96-2.23,36.72-1.86c40.14,1.24,80.33,4.35,120.57,4.19c18.9-0.1,38.22-4.45,56.55-9.58
		c33.66-9.43,60.54-28.17,71.26-63.44c8.08-26.36,26.05-39.1,51.53-47.13c24.86-7.82,48.01-20.97,72.56-30.14
		c25.95-9.58,46.92-23.98,56.71-50.7c10.31-28.28,32.89-34.44,58.88-33.25c13.83,0.62,27.66,3.99,41.17,7.25
		c33.97,8.23,64.84,2.74,96.28-13.1c58.37-29.36,112.54-63.91,159.2-109.95c9.89-9.74,21.39-18.07,32.94-25.9
		c50.55-34.54,101.3-68.93,152.21-102.91c21.96-14.61,43.14-29.47,60.23-50.18c8.65-10.51,20.41-20.61,32.89-25.38
		c47.08-18.07,81.98-52.98,120.62-82.91c16.47-12.74,33.56-25.48,52-34.91c72.87-37.08,133.98-88.04,186.03-150.92
		c21.13-25.53,44.59-49.3,68.47-72.3c21.08-20.25,34.34-43.35,38.48-72.51c11.45-79.96,17.35-159.82,10.36-240.77
		c-5.59-65.1-18.8-127.87-41.79-188.93c-8.55-22.63-18.13-45.21-20.61-67.95c11.91-15.48,19.73,4.19,31.13-2.64
		c0.05-0.05,3.94-3.11,3.47-5.28c-2.64-13.41-6.27-26.62-10.62-44.13c8.44,0.83,15.48-0.46,19.89,2.33
		c13.98,8.96,21.44,27.19,40.19,30.35c1.71-4.45,4.35-7.87,3.78-10.57c-17.87-81.77-38.07-90.53-105.29-50.55
		c-50.96,30.35-103.48,58.88-151.28,93.74c-39.15,28.54-83.9,42.62-126.63,61.78c-42.93,19.27-88.04,33.56-131.65,51.48
		c-17.97,7.4-35.53,12.58-55.16,14.66c-43.45,4.66-86.59,10.2-130.61,8.55c-16.99-0.67-34.23,5.07-51.22,8.65
		c-9.94,2.07-19.63,5.65-32.47,9.48c-2.8-11.13-5.85-18.8-6.32-26.62c-0.83-12.12,1.81-24.6,0.1-36.46
		c-3.68-24.55-16.93-43.24-42.42-47.49c-34.34-5.65-63.65-29.93-100.83-25.22c-6.89,0.83-15.43-6.68-22.27-11.65
		C2370.95,1940.17,2359.61,1930.48,2343.45,1917.59"
        />
        <path
          d="M2359.84,972.57c-37.24,12.59-75.15,25.43-114.04,38.64c-21.34-5.13-30.87-26.41-47.6-37.75
		c-15.12-10.31-37.75-9.84-44.44-34.54c36.25-76.18,74.58-151.95,137.45-212.96c89.23-86.54,176.14-175.41,265.37-262.01
		c56.5-54.84,115.7-106.94,172.87-161.17c34.29-32.47,66.76-66.81,100.32-100.06c13.78-13.62,17.87-29.73,13.98-48.06
		c-3.21-14.92-7.25-29.57-10.51-43.04c19.27-18.85,39.05,3.78,58.94-7.15c0.52-10.15,1.04-21.75,1.66-34.75
		c16.57-5.9,32.52-11.6,49.25-17.56c1.86-13.15,3.47-24.81,4.97-35.53c4.51-2.23,7.72-5.33,10.51-4.97
		c29.83,3.68,58.83,0.42,88.3-5.49c57.69-11.45,114.97-6.53,171.06,10.98c22.32,6.99,42.88,17.76,53.55,39.41
		c11.76,23.98,31.8,36.31,54.74,46.15c47.02,20.04,88.87,48.48,129.32,79.45c30.04,22.99,48.27,50.08,44.02,89.29
		c-0.72,6.89-1.29,14.6,0.98,20.87c22.01,60.75,6.01,125.43,19.68,186.96c1.55,6.68,2.07,14.4,0.26,20.87
		c-18.28,65.31-32.01,132.53-84.47,182.35c-35.89,34.13-76.03,61.58-119.89,84.06c-22.37,11.5-45.99,16-71.06,13.41
		c-15.69-1.61-31.38-3-47.08-3.47c-81.77-2.64-154.02,28.23-223.68,65.77c-25.9,14.03-48.48,34.18-72.66,51.38
		c-59.87,42.62-120,84.83-179.56,127.87c-29.78,21.54-62.61,37.81-93.48,57.28c-16.21,10.25-31.9,13.98-49.51,11.6
		c-22.43-3-44.75-7.46-66.96-11.96c-4.77-0.98-11.91-3.73-13.1-7.3c-7.82-23.77-32.16-25.17-48.22-37.5
		c-15.28-11.7-36.67-10.25-50.34-26.67C2389.67,993.96,2374.39,984.59,2359.84,972.57"
        />
      </g>
    </svg>
  );
}
